-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.467774962568
cusum  =  0.158760526039
eta  =  0.630566240439
hl_amp_ratio  =  0.217146294396
kurtosis  =  -0.360937693668
n_points  =  259
period  =  0.570915947593
period_SNR  =  34.8625735834
period_log10FAP  =  -28.3080668412
period_uncertainty  =  0.000135269828606
phase_cusum  =  0.26125319219
phase_eta  =  0.053454994609
phi21  =  -2.4578946831
phi31  =  -4.62395113208
quartile31  =  0.56
r21  =  0.476964232
r31  =  0.434677874939
shapiro_w  =  0.857893466949
skewness  =  -0.911073871315
slope_per10  =  -0.190740865727
slope_per90  =  0.275960008293
stetson_k  =  0.697436200237
weighted_mean  =  12.7832884479
weighted_std  =  0.399825743051
