-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.196793865787
cusum  =  0.10418031109
eta  =  0.614213529051
hl_amp_ratio  =  0.447112650466
kurtosis  =  0.0623520092476
n_points  =  415
period  =  0.525124533318
period_SNR  =  31.4914590354
period_log10FAP  =  -30.1778575696
period_uncertainty  =  0.000117833402469
phase_cusum  =  0.188178074881
phase_eta  =  0.9298413984
phi21  =  -1.89689249356
phi31  =  -3.12830763001
quartile31  =  0.31
r21  =  0.275101770217
r31  =  0.187043200649
shapiro_w  =  0.942666351795
skewness  =  -0.766422465362
slope_per10  =  -0.0618582533239
slope_per90  =  0.0723212704696
stetson_k  =  0.762194560319
weighted_mean  =  15.0369931374
weighted_std  =  0.220744460462
