-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.24006572334
cusum  =  0.204461101043
eta  =  0.592996787442
hl_amp_ratio  =  0.360122152451
kurtosis  =  0.414621409339
n_points  =  122
period  =  0.58240813922
period_SNR  =  13.6787210403
period_log10FAP  =  -6.97065311877
period_uncertainty  =  0.000197515776231
phase_cusum  =  0.206687971179
phase_eta  =  0.466506627279
phi21  =  -2.34384491112
phi31  =  -4.3381358281
quartile31  =  0.2175
r21  =  0.532146113474
r31  =  0.320784269519
shapiro_w  =  0.889848947525
skewness  =  -0.87952500026
slope_per10  =  -0.332266649542
slope_per90  =  0.601894917763
stetson_k  =  0.676190683101
weighted_mean  =  14.0009425608
weighted_std  =  0.204424606826
