-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.286454140181
cusum  =  0.10640126277
eta  =  0.591245019729
hl_amp_ratio  =  0.690511306474
kurtosis  =  -0.745124632021
n_points  =  270
period  =  0.68240351532
period_SNR  =  38.2832319284
period_log10FAP  =  -32.9508012505
period_uncertainty  =  0.000298680570379
phase_cusum  =  0.246098766124
phase_eta  =  0.461653280034
phi21  =  1.12590892056
phi31  =  2.50129829905
quartile31  =  0.3575
r21  =  0.424615184701
r31  =  0.113071481583
shapiro_w  =  0.961327970028
skewness  =  -0.417576580503
slope_per10  =  -0.148712992804
slope_per90  =  0.219466664518
stetson_k  =  0.786799659499
weighted_mean  =  15.6541081882
weighted_std  =  0.24588928139
