-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.258264223711
cusum  =  0.168231307745
eta  =  0.770703061687
hl_amp_ratio  =  0.407729483943
kurtosis  =  -0.166166328613
n_points  =  221
period  =  0.588557260246
period_SNR  =  30.9410066729
period_log10FAP  =  -23.415902688
period_uncertainty  =  0.000122437546436
phase_cusum  =  0.246483593043
phase_eta  =  0.165248121238
phi21  =  -2.14352158562
phi31  =  -0.974082064208
quartile31  =  0.29
r21  =  0.515616673482
r31  =  0.326468194315
shapiro_w  =  0.925846517086
skewness  =  -0.765134978716
slope_per10  =  -0.206339703122
slope_per90  =  0.232801145208
stetson_k  =  0.690916295746
weighted_mean  =  16.3901177789
weighted_std  =  0.219018693094
