-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.251746035338
cusum  =  0.134123701464
eta  =  0.519490648186
hl_amp_ratio  =  0.755827160413
kurtosis  =  -1.10660970495
n_points  =  234
period  =  0.784883705613
period_SNR  =  36.1587656963
period_log10FAP  =  -31.121244197
period_uncertainty  =  0.000187287331421
phase_cusum  =  0.289926374182
phase_eta  =  0.0818803938776
phi21  =  -1.82714686087
phi31  =  -3.30881621691
quartile31  =  0.32
r21  =  0.448888098576
r31  =  0.269174745817
shapiro_w  =  0.958314538002
skewness  =  -0.209083214411
slope_per10  =  -0.501588769096
slope_per90  =  0.685603383629
stetson_k  =  0.850722568387
weighted_mean  =  13.4651080845
weighted_std  =  0.189652003411
