-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.274682948611
cusum  =  0.178615339775
eta  =  0.690544083511
hl_amp_ratio  =  0.733369826364
kurtosis  =  -0.732981330873
n_points  =  122
period  =  0.733968995621
period_SNR  =  17.939005046
period_log10FAP  =  -11.1001146234
period_uncertainty  =  0.000267871929656
phase_cusum  =  0.318703094694
phase_eta  =  0.2332951621
phi21  =  -1.98437660545
phi31  =  -3.96937662177
quartile31  =  0.37
r21  =  0.551869499807
r31  =  0.274348835055
shapiro_w  =  0.960941255093
skewness  =  -0.331289273853
slope_per10  =  -0.471675146703
slope_per90  =  0.685635139181
stetson_k  =  0.807304526623
weighted_mean  =  14.7952008261
weighted_std  =  0.234771453553
