-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.318614644669
cusum  =  0.119198118304
eta  =  0.598333966388
hl_amp_ratio  =  0.328639040363
kurtosis  =  -0.541375349223
n_points  =  366
period  =  0.651554984654
period_SNR  =  42.044855064
period_log10FAP  =  -46.5917180344
period_uncertainty  =  0.000119044618419
phase_cusum  =  0.224581405942
phase_eta  =  0.0771568037967
phi21  =  0.900598378798
phi31  =  1.95003167099
quartile31  =  0.4375
r21  =  0.490598986132
r31  =  0.384938099361
shapiro_w  =  0.911809682846
skewness  =  -0.743810586839
slope_per10  =  -0.148832053589
slope_per90  =  0.338960077191
stetson_k  =  0.755145923597
weighted_mean  =  13.2452650823
weighted_std  =  0.291992419836
