-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.166318041965
cusum  =  0.130374272699
eta  =  0.48458685888
hl_amp_ratio  =  0.551020523045
kurtosis  =  -1.06310202687
n_points  =  289
period  =  0.729286578626
period_SNR  =  36.0837589133
period_log10FAP  =  -37.3548400025
period_uncertainty  =  0.000148615627588
phase_cusum  =  0.284735096036
phase_eta  =  0.412302834414
phi21  =  1.17243090898
phi31  =  -0.475022251357
quartile31  =  0.24
r21  =  0.324607396828
r31  =  0.140423940715
shapiro_w  =  0.944908738136
skewness  =  -0.348290570742
slope_per10  =  -0.29583626679
slope_per90  =  0.373802227201
stetson_k  =  0.836795072252
weighted_mean  =  14.8634366496
weighted_std  =  0.138129746226
