-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.51


######### Lightcurve features #########

amplitude  =  0.265322625359
cusum  =  0.133065960264
eta  =  0.541808985874
hl_amp_ratio  =  1.12844202895
kurtosis  =  -1.37756703099
n_points  =  337
period  =  0.85519655452
period_SNR  =  50.9864752674
period_log10FAP  =  -54.1750470163
period_uncertainty  =  0.000199272205959
phase_cusum  =  0.232510915321
phase_eta  =  0.251450072951
phi21  =  -2.07712751508
phi31  =  -2.78447693692
quartile31  =  0.39
r21  =  0.147998575972
r31  =  0.0025062285335
shapiro_w  =  0.931706726551
skewness  =  0.0197617537394
slope_per10  =  -0.265900005276
slope_per90  =  0.236733332276
stetson_k  =  0.894644769706
weighted_mean  =  15.098417384
weighted_std  =  0.209537696858
