-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.292168541426
cusum  =  0.157915106756
eta  =  0.589415719475
hl_amp_ratio  =  0.443131673275
kurtosis  =  -0.887053325483
n_points  =  266
period  =  0.593105482981
period_SNR  =  39.5670710633
period_log10FAP  =  -35.0029106061
period_uncertainty  =  0.000179571748022
phase_cusum  =  0.21852923227
phase_eta  =  0.133969162392
phi21  =  -1.9698319107
phi31  =  -0.943658082658
quartile31  =  0.4175
r21  =  0.549623799282
r31  =  0.36381622313
shapiro_w  =  0.927903592587
skewness  =  -0.551986025445
slope_per10  =  -0.140931650613
slope_per90  =  0.101942336522
stetson_k  =  0.755837676579
weighted_mean  =  16.1514700174
weighted_std  =  0.267285225229
