-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.21782589232
cusum  =  0.118289840713
eta  =  0.756100685368
hl_amp_ratio  =  0.674673678249
kurtosis  =  0.359415974807
n_points  =  303
period  =  0.662290402822
period_SNR  =  42.2903871021
period_log10FAP  =  -33.4590830812
period_uncertainty  =  0.000150726089469
phase_cusum  =  0.256171085963
phase_eta  =  0.422014986023
phi21  =  1.23238027701
phi31  =  2.82172180652
quartile31  =  0.27
r21  =  0.476651007409
r31  =  0.273643769023
shapiro_w  =  0.974940299988
skewness  =  -0.104875569055
slope_per10  =  -0.162333635082
slope_per90  =  0.230747583448
stetson_k  =  0.789746449147
weighted_mean  =  14.4954979026
weighted_std  =  0.182784986121
