-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.358192765891
cusum  =  0.180809577806
eta  =  0.560208795881
hl_amp_ratio  =  0.382980948727
kurtosis  =  -1.03327164043
n_points  =  262
period  =  0.579488207171
period_SNR  =  41.0696671042
period_log10FAP  =  -34.9997736687
period_uncertainty  =  0.000153934983531
phase_cusum  =  0.228606240579
phase_eta  =  0.118686247551
phi21  =  0.9091361545
phi31  =  1.91173318979
quartile31  =  0.61
r21  =  0.558512953993
r31  =  0.339351797151
shapiro_w  =  0.902820527554
skewness  =  -0.569262236084
slope_per10  =  -0.101857209513
slope_per90  =  0.266999365362
stetson_k  =  0.757508326673
weighted_mean  =  15.0186465638
weighted_std  =  0.346389040642
