-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.210399676899
cusum  =  0.105830619723
eta  =  0.779786557494
hl_amp_ratio  =  0.49185406431
kurtosis  =  -0.551986306056
n_points  =  112
period  =  0.555561904454
period_SNR  =  17.4133709523
period_log10FAP  =  -10.5081760787
period_uncertainty  =  0.000112071719148
phase_cusum  =  0.297768771034
phase_eta  =  0.306921682483
phi21  =  -2.23542153117
phi31  =  -0.4151247808
quartile31  =  0.3125
r21  =  0.47352553801
r31  =  0.139463284921
shapiro_w  =  0.9376283288
skewness  =  -0.626868182784
slope_per10  =  -0.356999998912
slope_per90  =  0.485799997114
stetson_k  =  0.772399208066
weighted_mean  =  15.0446944591
weighted_std  =  0.198421024543
