-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.65


######### Lightcurve features #########

amplitude  =  0.353329661503
cusum  =  0.214176239028
eta  =  0.530744262728
hl_amp_ratio  =  0.504013307847
kurtosis  =  -0.760747574719
n_points  =  131
period  =  0.837516059937
period_SNR  =  19.5918440162
period_log10FAP  =  -14.375562409
period_uncertainty  =  0.000308266547351
phase_cusum  =  0.292810183576
phase_eta  =  0.421602808185
phi21  =  0.969080746901
phi31  =  -1.78982241216
quartile31  =  0.46
r21  =  0.41816031184
r31  =  0.242516808731
shapiro_w  =  0.901506066322
skewness  =  -0.667791649564
slope_per10  =  -0.432599990939
slope_per90  =  0.587829061719
stetson_k  =  0.772855647656
weighted_mean  =  14.5207527632
weighted_std  =  0.300627203028
