-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.359980898021
cusum  =  0.121274704024
eta  =  0.932337677301
hl_amp_ratio  =  0.306137888896
kurtosis  =  -0.121593643337
n_points  =  233
period  =  0.574349314452
period_SNR  =  35.1923603953
period_log10FAP  =  -25.4187034679
period_uncertainty  =  0.000159110563272
phase_cusum  =  0.256431656915
phase_eta  =  0.267110128019
phi21  =  0.588374044139
phi31  =  -1.62090352
quartile31  =  0.47
r21  =  0.503711576408
r31  =  0.378285238468
shapiro_w  =  0.896778941154
skewness  =  -0.692196768179
slope_per10  =  -0.214054097753
slope_per90  =  0.305372308545
stetson_k  =  0.70409853796
weighted_mean  =  9.85779098361
weighted_std  =  0.320984808512
