-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.317403959389
cusum  =  0.205000030411
eta  =  0.704306679537
hl_amp_ratio  =  0.31016172459
kurtosis  =  0.983255642104
n_points  =  303
period  =  0.586832835249
period_SNR  =  42.2411823111
period_log10FAP  =  -33.7390322825
period_uncertainty  =  0.000138050479549
phase_cusum  =  0.270411256686
phase_eta  =  0.324800040346
phi21  =  0.676612488817
phi31  =  1.32294553593
quartile31  =  0.285
r21  =  0.407463976212
r31  =  0.298957775794
shapiro_w  =  0.877270281315
skewness  =  -0.933652401252
slope_per10  =  -0.12237088922
slope_per90  =  0.161157851348
stetson_k  =  0.64006343895
weighted_mean  =  16.2622591995
weighted_std  =  0.266546953749
