-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.62


######### Lightcurve features #########

amplitude  =  0.126353049471
cusum  =  0.169561975562
eta  =  0.68826045829
hl_amp_ratio  =  0.854954990188
kurtosis  =  0.217723086123
n_points  =  290
period  =  0.366261361926
period_SNR  =  24.0114536787
period_log10FAP  =  -20.5718078293
period_uncertainty  =  3.78713464394e-05
phase_cusum  =  0.197325778727
phase_eta  =  1.07159375118
phi21  =  0.107640935273
phi31  =  1.50078518539
quartile31  =  0.2
r21  =  0.19624101639
r31  =  0.230118705731
shapiro_w  =  0.965277314186
skewness  =  -0.60259767432
slope_per10  =  -0.0646221304393
slope_per90  =  0.0725673790872
stetson_k  =  0.76398492716
weighted_mean  =  15.0261199793
weighted_std  =  0.154759025811
