-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.262924797498
cusum  =  0.167543557645
eta  =  0.571097645669
hl_amp_ratio  =  0.803818989307
kurtosis  =  -0.834556105176
n_points  =  356
period  =  0.745870741623
period_SNR  =  51.4126733178
period_log10FAP  =  -48.2706368456
period_uncertainty  =  0.000253654414671
phase_cusum  =  0.270554110811
phase_eta  =  0.219580429067
phi21  =  1.17302572461
phi31  =  -0.680775546855
quartile31  =  0.335
r21  =  0.482774129481
r31  =  0.263401447761
shapiro_w  =  0.961161494255
skewness  =  -0.377412402296
slope_per10  =  -0.211704950354
slope_per90  =  0.289507589511
stetson_k  =  0.833013128469
weighted_mean  =  14.4336666883
weighted_std  =  0.222050855889
