-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.303136986947
cusum  =  0.129232391286
eta  =  0.630833732264
hl_amp_ratio  =  0.547214102823
kurtosis  =  -0.473138419835
n_points  =  233
period  =  0.538304066605
period_SNR  =  29.8940310911
period_log10FAP  =  -23.73074833
period_uncertainty  =  0.000107118085478
phase_cusum  =  0.330157924014
phase_eta  =  0.190601693933
phi21  =  0.711144270554
phi31  =  -1.12282320588
quartile31  =  0.39
r21  =  0.497440825095
r31  =  0.40436324541
shapiro_w  =  0.936948120594
skewness  =  -0.591298599534
slope_per10  =  -0.17073347803
slope_per90  =  0.219938515412
stetson_k  =  0.759002072979
weighted_mean  =  15.2308400443
weighted_std  =  0.271948349107
