-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.307346193908
cusum  =  0.203304415064
eta  =  0.615155435275
hl_amp_ratio  =  0.488004878156
kurtosis  =  -0.144046975283
n_points  =  108
period  =  0.560281287043
period_SNR  =  17.8778898886
period_log10FAP  =  -11.427147358
period_uncertainty  =  0.000202019671508
phase_cusum  =  0.274115130203
phase_eta  =  0.28476391258
phi21  =  1.0324384995
phi31  =  2.22471854906
quartile31  =  0.315
r21  =  0.424307070309
r31  =  0.235541906069
shapiro_w  =  0.946840643883
skewness  =  -0.674698284914
slope_per10  =  -0.341430998843
slope_per90  =  0.516880487984
stetson_k  =  0.733884782933
weighted_mean  =  14.2692572265
weighted_std  =  0.215201122048
