-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.321370442182
cusum  =  0.121375655536
eta  =  0.538224575599
hl_amp_ratio  =  0.529752771212
kurtosis  =  -0.518170844837
n_points  =  436
period  =  0.609338597279
period_SNR  =  51.6650974515
period_log10FAP  =  -54.1031989844
period_uncertainty  =  0.000117300812345
phase_cusum  =  0.248119764012
phase_eta  =  0.171427426139
phi21  =  -2.47735800496
phi31  =  -4.52852866955
quartile31  =  0.445
r21  =  0.440279737571
r31  =  0.359437426621
shapiro_w  =  0.934060096741
skewness  =  -0.590052221507
slope_per10  =  -0.102838039134
slope_per90  =  0.133655058476
stetson_k  =  0.821385092153
weighted_mean  =  13.3711102388
weighted_std  =  0.281960084041
