<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.392269805086
cusum  =  0.0861967338406
eta  =  0.530480617145
hl_amp_ratio  =  0.348917691547
kurtosis  =  -0.95266014723
n_points  =  453
period  =  0.494265910456
period_SNR  =  56.9434037331
period_log10FAP  =  -63.0120834422
period_uncertainty  =  6.62519327357e-05
phase_cusum  =  0.270700870327
phase_eta  =  0.0672851268684
phi21  =  -2.37135169322
phi31  =  -4.61732267856
quartile31  =  0.59
r21  =  0.445021703636
r31  =  0.327932573253
shapiro_w  =  0.873499453068
skewness  =  -0.645935897276
slope_per10  =  -0.0978611815351
slope_per90  =  0.176696649571
stetson_k  =  0.787068960772
weighted_mean  =  13.793105488
weighted_std  =  0.346085136367
</pre></body></html>