-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.252503072071
cusum  =  0.164217082298
eta  =  0.405975955857
hl_amp_ratio  =  0.484270154499
kurtosis  =  -0.603742684925
n_points  =  392
period  =  0.646015280414
period_SNR  =  50.4345715513
period_log10FAP  =  -54.9535108282
period_uncertainty  =  0.000116131318842
phase_cusum  =  0.268293264498
phase_eta  =  0.130909240529
phi21  =  -2.25534902194
phi31  =  -4.30646697253
quartile31  =  0.32
r21  =  0.438691583607
r31  =  0.287241956702
shapiro_w  =  0.917211592197
skewness  =  -0.690680916718
slope_per10  =  -0.127028136658
slope_per90  =  0.163379501192
stetson_k  =  0.787352291748
weighted_mean  =  14.8698374851
weighted_std  =  0.225582458075
