-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.244799879552
cusum  =  0.136707094284
eta  =  0.638654882599
hl_amp_ratio  =  0.738290808406
kurtosis  =  -1.00150669121
n_points  =  324
period  =  0.677140237376
period_SNR  =  41.7670007604
period_log10FAP  =  -45.7182535017
period_uncertainty  =  0.000124804677724
phase_cusum  =  0.28449356408
phase_eta  =  0.176190775948
phi21  =  -1.82551737857
phi31  =  -3.25955460546
quartile31  =  0.3325
r21  =  0.405582212967
r31  =  0.172096682972
shapiro_w  =  0.956498324871
skewness  =  -0.299661450151
slope_per10  =  -0.169316452034
slope_per90  =  0.17051776607
stetson_k  =  0.837466706631
weighted_mean  =  15.975208528
weighted_std  =  0.210505028642
