-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.235703596927
cusum  =  0.156457053958
eta  =  0.612636130285
hl_amp_ratio  =  0.461773147049
kurtosis  =  -0.556021947134
n_points  =  112
period  =  0.623937205003
period_SNR  =  16.7887891427
period_log10FAP  =  -10.7444844712
period_uncertainty  =  0.000141354153998
phase_cusum  =  0.318930041201
phase_eta  =  0.284955936702
phi21  =  0.890835368847
phi31  =  1.47298637019
quartile31  =  0.3025
r21  =  0.49760463978
r31  =  0.225880559065
shapiro_w  =  0.923901498318
skewness  =  -0.640408950182
slope_per10  =  -0.436700009741
slope_per90  =  0.410533330093
stetson_k  =  0.753639649435
weighted_mean  =  14.047223569
weighted_std  =  0.200054974949
