-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  0.556754488873
cusum  =  0.301382633879
eta  =  0.326305926811
hl_amp_ratio  =  0.645005001026
kurtosis  =  -0.00426516514096
n_points  =  31
period  =  1.13835907059
period_SNR  =  5.66457771032
period_log10FAP  =  -1.05987967915
period_uncertainty  =  0.000252669233601
phase_cusum  =  0.323961549683
phase_eta  =  0.290828870933
phi21  =  -0.326886482957
phi31  =  -3.06532530497
quartile31  =  0.255
r21  =  0.185216613279
r31  =  0.375415099397
shapiro_w  =  0.901986956596
skewness  =  -0.71044006422
slope_per10  =  -0.435800002888
slope_per90  =  0.354808927456
stetson_k  =  0.703550958661
weighted_mean  =  10.4677419355
weighted_std  =  0.283431845109
