-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.463979902095
cusum  =  0.165977184724
eta  =  0.600332531033
hl_amp_ratio  =  0.341257826422
kurtosis  =  -0.178023440707
n_points  =  112
period  =  0.642268734779
period_SNR  =  16.7698734788
period_log10FAP  =  -9.42113949475
period_uncertainty  =  0.00015537507597
phase_cusum  =  0.214101143981
phase_eta  =  0.373648720055
phi21  =  -2.38494487317
phi31  =  -4.62797179956
quartile31  =  0.445
r21  =  0.426277752945
r31  =  0.231862609952
shapiro_w  =  0.905256330967
skewness  =  -0.888198664555
slope_per10  =  -0.142626923552
slope_per90  =  0.345320207806
stetson_k  =  0.728820340646
weighted_mean  =  10.8357078987
weighted_std  =  0.375005690465
