-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.46


######### Lightcurve features #########

amplitude  =  0.578071141809
cusum  =  0.300002393176
eta  =  0.489127428378
hl_amp_ratio  =  0.181815963817
kurtosis  =  0.407282033682
n_points  =  66
period  =  0.15956542621
period_SNR  =  8.93816332067
period_log10FAP  =  -3.45028652556
period_uncertainty  =  5.89967006558e-06
phase_cusum  =  0.284113591003
phase_eta  =  0.640831149909
phi21  =  0.0281833284794
phi31  =  -3.07204848295
quartile31  =  0.3975
r21  =  0.432411702511
r31  =  0.162065827792
shapiro_w  =  0.785916924477
skewness  =  -1.30628228249
slope_per10  =  -0.0440701434643
slope_per90  =  0.12319999747
stetson_k  =  0.636420527096
weighted_mean  =  10.6322727273
weighted_std  =  0.442122276568
