-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  0.418631831547
cusum  =  0.097234144529
eta  =  1.60335093569
hl_amp_ratio  =  0.294925478357
kurtosis  =  0.230583980406
n_points  =  225
period  =  0.093525742285
period_SNR  =  10.6452011873
period_log10FAP  =  -0.78209116967
period_uncertainty  =  2.27708910683e-06
phase_cusum  =  0.194103764802
phase_eta  =  1.4864432977
phi21  =  -3.67917806016
phi31  =  -3.86117790171
quartile31  =  0.89
r21  =  0.393518069758
r31  =  0.163338697861
shapiro_w  =  0.852484762669
skewness  =  -1.11973114602
slope_per10  =  -0.00325977874007
slope_per90  =  0.00383907368633
stetson_k  =  0.672210006368
weighted_mean  =  14.9906137421
weighted_std  =  0.809875184674
