-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.236331515799
cusum  =  0.164039949106
eta  =  0.682772153365
hl_amp_ratio  =  0.541608899825
kurtosis  =  -1.07891810194
n_points  =  234
period  =  0.71016545911
period_SNR  =  33.9649842286
period_log10FAP  =  -33.9257281304
period_uncertainty  =  0.000169814801463
phase_cusum  =  0.23429275202
phase_eta  =  0.0829120975064
phi21  =  0.85129906579
phi31  =  1.95835358354
quartile31  =  0.34
r21  =  0.388663781496
r31  =  0.286759951257
shapiro_w  =  0.932136297226
skewness  =  -0.348349530948
slope_per10  =  -0.322300004773
slope_per90  =  0.615000003017
stetson_k  =  0.835826704262
weighted_mean  =  14.8240019439
weighted_std  =  0.204030513621
