-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.330432520346
cusum  =  0.212618516153
eta  =  0.544479265006
hl_amp_ratio  =  0.626683047581
kurtosis  =  -0.90668638388
n_points  =  239
period  =  0.540049410946
period_SNR  =  36.6497300615
period_log10FAP  =  -30.7502750583
period_uncertainty  =  0.000178919119475
phase_cusum  =  0.286573980134
phase_eta  =  0.0863449339778
phi21  =  0.822119100865
phi31  =  -1.34182761948
quartile31  =  0.465
r21  =  0.422754505874
r31  =  0.355471506635
shapiro_w  =  0.913239836693
skewness  =  -0.54718969902
slope_per10  =  -0.20357626318
slope_per90  =  0.21369693861
stetson_k  =  0.803376710427
weighted_mean  =  16.3137329966
weighted_std  =  0.287821939849
