-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.377977662726
cusum  =  0.125997171199
eta  =  0.546506291362
hl_amp_ratio  =  0.571109158514
kurtosis  =  -0.621559259165
n_points  =  364
period  =  0.698470118286
period_SNR  =  43.522307599
period_log10FAP  =  -38.0983903119
period_uncertainty  =  0.00013957120635
phase_cusum  =  0.290602483961
phase_eta  =  0.238266825306
phi21  =  -2.10199201266
phi31  =  -4.25193653704
quartile31  =  0.5
r21  =  0.541479248883
r31  =  0.310316896493
shapiro_w  =  0.948392093182
skewness  =  -0.537292130344
slope_per10  =  -0.0954646206996
slope_per90  =  0.188275444695
stetson_k  =  0.78183952859
weighted_mean  =  12.0039083684
weighted_std  =  0.336148416402
