-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.259310048011
cusum  =  0.116437117197
eta  =  0.665315970379
hl_amp_ratio  =  0.494883115326
kurtosis  =  -0.0328799895059
n_points  =  234
period  =  0.572000466657
period_SNR  =  35.4026331734
period_log10FAP  =  -26.932833937
period_uncertainty  =  0.000100810800795
phase_cusum  =  0.295184406407
phase_eta  =  0.579427910697
phi21  =  0.667478970341
phi31  =  -1.11832872929
quartile31  =  0.3075
r21  =  0.347408795177
r31  =  0.12857548543
shapiro_w  =  0.942946076393
skewness  =  -0.73723585551
slope_per10  =  -0.185616011518
slope_per90  =  0.243833337445
stetson_k  =  0.77532346813
weighted_mean  =  14.7361519102
weighted_std  =  0.208312605559
