-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.192583527439
cusum  =  0.0863873014764
eta  =  0.5736508339
hl_amp_ratio  =  0.735464375019
kurtosis  =  -1.25602540383
n_points  =  392
period  =  0.611958896608
period_SNR  =  50.4756463713
period_log10FAP  =  -54.9349040963
period_uncertainty  =  0.000104195142961
phase_cusum  =  0.243457530836
phase_eta  =  0.399456659619
phi21  =  -2.16436835461
phi31  =  -3.45135164659
quartile31  =  0.3
r21  =  0.33095699979
r31  =  0.158772153989
shapiro_w  =  0.936438262463
skewness  =  -0.129739676022
slope_per10  =  -0.137799641378
slope_per90  =  0.217429496744
stetson_k  =  0.877995636641
weighted_mean  =  15.2744250289
weighted_std  =  0.17147148697
