-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.170168755968
cusum  =  0.128875918419
eta  =  0.704244921835
hl_amp_ratio  =  0.710872759824
kurtosis  =  -0.145441013583
n_points  =  279
period  =  0.36063546138
period_SNR  =  40.8030886746
period_log10FAP  =  -30.3558566132
period_uncertainty  =  3.70399187618e-05
phase_cusum  =  0.226355498043
phase_eta  =  0.792407245081
phi21  =  1.7995542132
phi31  =  2.82136536826
quartile31  =  0.2
r21  =  0.223918891943
r31  =  0.10201637613
shapiro_w  =  0.967833042145
skewness  =  -0.584348278287
slope_per10  =  -0.110316324309
slope_per90  =  0.0878013703259
stetson_k  =  0.793044193625
weighted_mean  =  13.2243272305
weighted_std  =  0.144308336963
