-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.34770616703
cusum  =  0.170606235151
eta  =  0.482367817803
hl_amp_ratio  =  0.387410742412
kurtosis  =  -0.787484545186
n_points  =  206
period  =  0.626992081702
period_SNR  =  31.1277168253
period_log10FAP  =  -25.4238134601
period_uncertainty  =  0.000185267677165
phase_cusum  =  0.243096431374
phase_eta  =  0.196988449313
phi21  =  -2.31605957768
phi31  =  -4.29444332181
quartile31  =  0.46
r21  =  0.46314013888
r31  =  0.227928516541
shapiro_w  =  0.907980203629
skewness  =  -0.673702002926
slope_per10  =  -0.218739939389
slope_per90  =  0.174915080593
stetson_k  =  0.727160726343
weighted_mean  =  16.3499407629
weighted_std  =  0.313800175498
