<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.286808935351
cusum  =  0.171280986678
eta  =  0.406883432892
hl_amp_ratio  =  0.450837169622
kurtosis  =  -0.477999981882
n_points  =  333
period  =  0.497098182684
period_SNR  =  41.2181605634
period_log10FAP  =  -41.6418182474
period_uncertainty  =  6.96450056112e-05
phase_cusum  =  0.228623671248
phase_eta  =  0.275938363849
phi21  =  -2.20751305867
phi31  =  -4.39033599399
quartile31  =  0.44
r21  =  0.392381934469
r31  =  0.279677283777
shapiro_w  =  0.930127024651
skewness  =  -0.670062782244
slope_per10  =  -0.0808298041719
slope_per90  =  0.064159528671
stetson_k  =  0.765098869804
weighted_mean  =  16.8904048405
weighted_std  =  0.281999693194
</pre></body></html>