-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.229438755768
cusum  =  0.184882746964
eta  =  0.637749761858
hl_amp_ratio  =  0.427463798725
kurtosis  =  -1.21292350861
n_points  =  127
period  =  0.558950974739
period_SNR  =  18.5894448867
period_log10FAP  =  -13.6997558754
period_uncertainty  =  0.000179496156604
phase_cusum  =  0.33244036541
phase_eta  =  0.322157231289
phi21  =  -2.31807209803
phi31  =  -1.07085879058
quartile31  =  0.405
r21  =  0.312296865547
r31  =  0.295667151865
shapiro_w  =  0.90194940567
skewness  =  -0.442528272102
slope_per10  =  -0.262016662552
slope_per90  =  0.353049994446
stetson_k  =  0.808137503061
weighted_mean  =  14.208125
weighted_std  =  0.217418072014
