-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.140880763474
cusum  =  0.113546494146
eta  =  0.529941177802
hl_amp_ratio  =  1.54019116795
kurtosis  =  -1.53030792318
n_points  =  310
period  =  0.247007456092
period_SNR  =  17.5828618372
period_log10FAP  =  -15.6636283952
period_uncertainty  =  1.35994855938e-05
phase_cusum  =  0.1591225328
phase_eta  =  1.41813820597
phi21  =  0.998659952569
phi31  =  1.52685711032
quartile31  =  0.3275
r21  =  0.134525937483
r31  =  0.0183140015697
shapiro_w  =  0.899732410908
skewness  =  0.0903747688658
slope_per10  =  -0.0349356363172
slope_per90  =  0.0390286839262
stetson_k  =  0.890604680081
weighted_mean  =  13.538941222
weighted_std  =  0.165905331173
