-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.62


######### Lightcurve features #########

amplitude  =  0.236810719675
cusum  =  0.11372637166
eta  =  0.688506497993
hl_amp_ratio  =  1.18363395028
kurtosis  =  -0.815266917475
n_points  =  231
period  =  0.883121491618
period_SNR  =  38.5833892713
period_log10FAP  =  -31.7920558326
period_uncertainty  =  0.00026755854555
phase_cusum  =  0.300874048307
phase_eta  =  0.181124976723
phi21  =  -1.8442195699
phi31  =  -5.4093163721
quartile31  =  0.36
r21  =  0.375311902869
r31  =  0.0991818625783
shapiro_w  =  0.963276803493
skewness  =  0.0318809720419
slope_per10  =  -0.321889565565
slope_per90  =  0.456466670148
stetson_k  =  0.842466825408
weighted_mean  =  9.60532467532
weighted_std  =  0.188867101507
