-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.350288918962
cusum  =  0.131999449802
eta  =  0.540144330435
hl_amp_ratio  =  0.442218886316
kurtosis  =  -0.694384483786
n_points  =  384
period  =  0.649770342298
period_SNR  =  56.5121073614
period_log10FAP  =  -50.3718111717
period_uncertainty  =  0.000120363508392
phase_cusum  =  0.259371454868
phase_eta  =  0.108214776253
phi21  =  0.884252267807
phi31  =  -1.08243468335
quartile31  =  0.48
r21  =  0.486422346427
r31  =  0.316540557932
shapiro_w  =  0.928262650967
skewness  =  -0.472633882351
slope_per10  =  -0.144114907657
slope_per90  =  0.173643284948
stetson_k  =  0.777817982948
weighted_mean  =  14.4708058566
weighted_std  =  0.317106800001
