-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.422062729897
cusum  =  0.166829185216
eta  =  0.76799140277
hl_amp_ratio  =  0.756948353036
kurtosis  =  -0.0375842171854
n_points  =  99
period  =  0.473869673704
period_SNR  =  13.6338591197
period_log10FAP  =  -5.09498773086
period_uncertainty  =  0.000151600579213
phase_cusum  =  0.291599913796
phase_eta  =  0.393980052945
phi21  =  -2.85517194052
phi31  =  -1.61693664348
quartile31  =  0.565
r21  =  0.613374582374
r31  =  0.471938377947
shapiro_w  =  0.984327375889
skewness  =  -0.194612333498
slope_per10  =  -0.117504086364
slope_per90  =  0.370390018119
stetson_k  =  0.783229119089
weighted_mean  =  13.061425724
weighted_std  =  0.422364060503
