-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  1.45204307021
cusum  =  0.358173087397
eta  =  0.221991856155
hl_amp_ratio  =  0.507097355211
kurtosis  =  0.150045010237
n_points  =  341
period  =  0.997288425666
period_SNR  =  40.7857989198
period_log10FAP  =  -38.7605267949
period_uncertainty  =  0.000336202451626
phase_cusum  =  0.247062175699
phase_eta  =  0.566132857208
phi21  =  -2.52362348142
phi31  =  -2.3716627377
quartile31  =  0.53
r21  =  0.530393954631
r31  =  0.26057421518
shapiro_w  =  0.920391798019
skewness  =  -0.917975771199
slope_per10  =  -0.0243211742501
slope_per90  =  0.0461307485065
stetson_k  =  0.740269388024
weighted_mean  =  11.2099462103
weighted_std  =  0.390835037383
