<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.300857365771
cusum  =  0.110004268199
eta  =  0.513644346827
hl_amp_ratio  =  0.675476015061
kurtosis  =  -0.659084503315
n_points  =  372
period  =  0.684319060787
period_SNR  =  41.0464798499
period_log10FAP  =  -43.3154039668
period_uncertainty  =  0.000160814452118
phase_cusum  =  0.280718466457
phase_eta  =  0.523826842482
phi21  =  1.22001770791
phi31  =  2.30210646625
quartile31  =  0.49
r21  =  0.483882136141
r31  =  0.300232278462
shapiro_w  =  0.971890151501
skewness  =  -0.110149568231
slope_per10  =  -0.0930200274108
slope_per90  =  0.117402086632
stetson_k  =  0.812093577689
weighted_mean  =  12.2487612208
weighted_std  =  0.308228404091
</pre></body></html>