-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.256435432182
cusum  =  0.14883601359
eta  =  0.469806805365
hl_amp_ratio  =  0.910878228476
kurtosis  =  -0.830380402669
n_points  =  392
period  =  0.736638560302
period_SNR  =  51.203580081
period_log10FAP  =  -56.7575397159
period_uncertainty  =  0.00015100003895
phase_cusum  =  0.235023246578
phase_eta  =  0.230930160415
phi21  =  1.25958253534
phi31  =  2.12945713316
quartile31  =  0.33
r21  =  0.338636504003
r31  =  0.104963032819
shapiro_w  =  0.96332269907
skewness  =  -0.265754606962
slope_per10  =  -0.155663959512
slope_per90  =  0.215248816931
stetson_k  =  0.815174728632
weighted_mean  =  14.5205750838
weighted_std  =  0.21483185364
