-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.259316004902
cusum  =  0.140507298958
eta  =  0.636049736673
hl_amp_ratio  =  0.728649856828
kurtosis  =  -0.159413705545
n_points  =  299
period  =  0.681138817475
period_SNR  =  34.8318928002
period_log10FAP  =  -32.3797484264
period_uncertainty  =  0.000129839657117
phase_cusum  =  0.235015085252
phase_eta  =  0.407703693797
phi21  =  4.34526282666
phi31  =  5.59985734355
quartile31  =  0.33
r21  =  0.409414530489
r31  =  0.153180123441
shapiro_w  =  0.978894174099
skewness  =  -0.439865172733
slope_per10  =  -0.22480337842
slope_per90  =  0.195828301458
stetson_k  =  0.782790247097
weighted_mean  =  12.4253382604
weighted_std  =  0.233610675156
