<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.283922329781
cusum  =  0.156523400868
eta  =  0.625613291566
hl_amp_ratio  =  0.533246604902
kurtosis  =  -1.3631990192
n_points  =  284
period  =  0.546205137063
period_SNR  =  42.6034132507
period_log10FAP  =  -37.7352512941
period_uncertainty  =  0.000136722195032
phase_cusum  =  0.259268923387
phase_eta  =  0.0237356796931
phi21  =  0.858744242774
phi31  =  -1.05067104893
quartile31  =  0.54
r21  =  0.543185259512
r31  =  0.380454097263
shapiro_w  =  0.916289865971
skewness  =  -0.261107577856
slope_per10  =  -0.185790430143
slope_per90  =  0.281871175964
stetson_k  =  0.826637079543
weighted_mean  =  14.5225339926
weighted_std  =  0.291889060622
</pre></body></html>