-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.21710944043
cusum  =  0.198480520995
eta  =  0.630254059274
hl_amp_ratio  =  0.617979839823
kurtosis  =  -0.563037126442
n_points  =  166
period  =  0.573017178965
period_SNR  =  25.9862816559
period_log10FAP  =  -19.6620762926
period_uncertainty  =  0.000155711200717
phase_cusum  =  0.303448338008
phase_eta  =  0.129906300411
phi21  =  1.0761263831
phi31  =  5.10342791453
quartile31  =  0.26
r21  =  0.556399039427
r31  =  0.344260990843
shapiro_w  =  0.907040953636
skewness  =  -0.738150352033
slope_per10  =  -0.177723630178
slope_per90  =  0.473028925386
stetson_k  =  0.785179923927
weighted_mean  =  13.1240705099
weighted_std  =  0.204944631074
