-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.319919657676
cusum  =  0.0987702537492
eta  =  0.592341944166
hl_amp_ratio  =  0.367531813913
kurtosis  =  -0.551328694279
n_points  =  223
period  =  0.620524334784
period_SNR  =  29.5733241861
period_log10FAP  =  -24.2909802013
period_uncertainty  =  0.000142093970076
phase_cusum  =  0.236892402178
phase_eta  =  0.0702317612444
phi21  =  -2.17517258102
phi31  =  -4.00627000382
quartile31  =  0.35
r21  =  0.520375258666
r31  =  0.378352194341
shapiro_w  =  0.909086227417
skewness  =  -0.75829564132
slope_per10  =  -0.186209825814
slope_per90  =  0.354256233829
stetson_k  =  0.72132250991
weighted_mean  =  15.3062296686
weighted_std  =  0.263433112619
